CREATE TABLE [MIDDB].[dbo].[view_接口统计] (
	id int identity(1,1) not null,
	ip varchar(100) DEFAULT '' NULL,
	[名称] varchar(100) DEFAULT '' NULL,
	[类型] varchar(100) DEFAULT '' NULL,
	[请求次数] int DEFAULT 0 NULL,
	[操作时间] varchar(20) DEFAULT '' NULL,
	create_time datetime NULL,
	update_time datetime NULL,
	[inx] int DEFAULT 0 NULL,
	CONSTRAINT [view_接口统计_id] PRIMARY KEY (id)
);
ALTER TABLE MIDDB.dbo.view_接口统计 ADD  DEFAULT GETDATE() FOR create_time;
ALTER TABLE MIDDB.dbo.view_接口统计 ADD  DEFAULT GETDATE() FOR update_time;

--放到jkcloud tab_cdc_statistics
select [类型], [名称], [操作时间], [请求次数], update_time as 最新推送时间 from[MIDDB].[dbo].[view_接口统计] where [操作时间] = CONVERT(varchar(10), GETDATE(), 120);